<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">% I use a penalty to force a run of the output routine.
% But I was afraid that this penalty prohibites a break.

\edef\oldoutput{\the\output}
\output={\immediate\show O%
\oldoutput}

\dimen0=\vsize
\divide \dimen0 by 3
\advance \dimen0 by 1cm
\let\olderow=\erow
\edef\erow{\ht\cals@current@row=\the\dimen0 \noexpand\olderow}
%\show\erow

\begin{calstable}
\colwidths{{100pt}}
\thead{\brow \cell{aaa} \erow \immediate\show H}
\brow \cell{bbb} \erow \immediate\show 1
\brow \cell{ccc} \erow \immediate\show 2
\brow \cell{ddd} \erow \immediate\show 3
\end{calstable}
</pre></body></html>